-90 -80 -70 -60 -50 -40 -30 -20 -10 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5

Surface Temperature (deg C)

Snow cover (m)

-2-1-101234567

8910