-2 -1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0 100 200 300 400 500

SST (degrees Centigrade)

Oceanic heat flux (W m -2)

0 0.5 1 1.5 2 2.5 3 3.5 4 0 10 20 30 40 50

Deep sea temperature (degrees Centigrade)